depth [m] along track (northeast) a:shipboard; b,c:lowered

a

Spri97 0 100 200 300 400

b

0 100 200 300 400

1 2 3 5 6 7 8 9 10 11 12 13 14 15 16 17 18 19 20 21 22 23 24 25 26 27 28 29 30 31 32 33 34depth [m]

c

Celtic Shelf Azores

-26 -24 -22 -20 -18 -16 -14 -12

0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

-26 -24 -22 -20 -18 -16 -14 -12 -20 0 20 tide [cm s -1] longitude

-50 -40 -30 -20 -10 0 10 20 30 40 50 cm s -1

27.03°W, 38.82°N to 11.23°W, 49.18°N: 1997/05/30 to 1997/06/06